From 8a1915a73d1d1173059a212db3b79f8efcdd9e9e Mon Sep 17 00:00:00 2001
From: Tyler Schicke <tyler_schicke@brown.edu>
Date: Tue, 22 Jan 2019 20:31:32 -0500
Subject: Temporarily got rid of dvm to draastically improve performance and
 reduce number of re-renders

---
 src/Main.tsx | 4 ----
 1 file changed, 4 deletions(-)

(limited to 'src/Main.tsx')

diff --git a/src/Main.tsx b/src/Main.tsx
index 7c132f179..5482314ae 100644
--- a/src/Main.tsx
+++ b/src/Main.tsx
@@ -23,12 +23,8 @@ ReactDOM.render((
     <div>
         <FreeFormCanvas store={mainNodeCollection} />
         <DocumentDecorations />
-        <button onClick={minus}>-</button>
     </div>), document.getElementById('root'));
 
-function minus() {
-
-}
 runInAction(() => {
     let doc1 = Documents.TextDocument("Hello world");
     let doc2 = doc1.MakeDelegate();
-- 
cgit v1.2.3-70-g09d2

