From dc0ecb47cd4e63e4861b79c00fe131de4450f46b Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Tue, 26 Jul 2022 09:27:12 -0400
Subject: turned off resetriting text box resizing to max of scroll height. 
 fixed placement/behavior of sidebar anno button for text.

---
 src/client/views/DocumentDecorations.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/DocumentDecorations.tsx')

diff --git a/src/client/views/DocumentDecorations.tsx b/src/client/views/DocumentDecorations.tsx
index 922f037f4..432dd360a 100644
--- a/src/client/views/DocumentDecorations.tsx
+++ b/src/client/views/DocumentDecorations.tsx
@@ -521,7 +521,7 @@ export class DocumentDecorations extends React.Component<{ PanelWidth: number; P
                             } else doc._height = actualdH;
                         }
                     } else {
-                        const maxHeight = Math.max(nheight, NumCast(doc.scrollHeight, NumCast(doc[docView.LayoutFieldKey + '-scrollHeight']))) * docView.NativeDimScaling();
+                        const maxHeight = 0; //Math.max(nheight, NumCast(doc.scrollHeight, NumCast(doc[docView.LayoutFieldKey + '-scrollHeight']))) * docView.NativeDimScaling();
                         dH && (doc._height = actualdH > maxHeight && maxHeight ? maxHeight : actualdH);
                         dW && (doc._width = actualdW);
                         dH && (doc._autoHeight = false);
-- 
cgit v1.2.3-70-g09d2

