From 875129a9aa241d595aee9d2c0a679acd71bfd0d1 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Thu, 10 Mar 2022 14:11:09 -0500
Subject: fixed bug where ink stroke would become degenerate if on control
 point were selected with tangent handles but another control point were
 dragged.

---
 src/client/views/InkControlPtHandles.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/client/views/InkControlPtHandles.tsx')

diff --git a/src/client/views/InkControlPtHandles.tsx b/src/client/views/InkControlPtHandles.tsx
index 24f796105..a7f511ab4 100644
--- a/src/client/views/InkControlPtHandles.tsx
+++ b/src/client/views/InkControlPtHandles.tsx
@@ -51,6 +51,7 @@ export class InkControlPtHandles extends React.Component<InkControlProps> {
             const handleIndexB = (order === 3 ? controlIndex + 2 : controlIndex + 1) % this.props.inkCtrlPoints.length;
             const brokenIndices = Cast(this.props.inkDoc.brokenInkIndices, listSpec("number"));
             const wasSelected = InkStrokeProperties.Instance._currentPoint === controlIndex;
+            if (!wasSelected) InkStrokeProperties.Instance._currentPoint = -1;
             const origInk = this.props.inkCtrlPoints.slice();
             setupMoveUpEvents(this, e,
                 action((e: PointerEvent, down: number[], delta: number[]) => {
-- 
cgit v1.2.3-70-g09d2

