From 130b5c55f954a011e91355c79ade4b9f91bd84e9 Mon Sep 17 00:00:00 2001
From: Tyler Schicke <tyler_schicke@brown.edu>
Date: Sat, 18 May 2019 18:17:39 -0400
Subject: clamped scale and reverted safe mode

---
 src/client/views/collections/CollectionBaseView.tsx | 14 +++++++-------
 1 file changed, 7 insertions(+), 7 deletions(-)

(limited to 'src/client/views/collections/CollectionBaseView.tsx')

diff --git a/src/client/views/collections/CollectionBaseView.tsx b/src/client/views/collections/CollectionBaseView.tsx
index 73eb1fbbc..2da8c4e40 100644
--- a/src/client/views/collections/CollectionBaseView.tsx
+++ b/src/client/views/collections/CollectionBaseView.tsx
@@ -16,7 +16,7 @@ export enum CollectionViewType {
     Schema,
     Docking,
     Tree,
-    RealFreeform
+    // RealFreeform
 }
 
 export interface CollectionRenderProps {
@@ -40,12 +40,12 @@ export class CollectionBaseView extends React.Component<CollectionViewProps> {
     get collectionViewType(): CollectionViewType | undefined {
         let Document = this.props.Document;
         let viewField = Cast(Document.viewType, "number");
-        if (viewField === CollectionViewType.Freeform) {
-            return CollectionViewType.Tree;
-        }
-        if (viewField === CollectionViewType.RealFreeform) {
-            return CollectionViewType.Freeform;
-        }
+        // if (viewField === CollectionViewType.Freeform) {
+        //     return CollectionViewType.Tree;
+        // }
+        // if (viewField === CollectionViewType.RealFreeform) {
+        //     return CollectionViewType.Freeform;
+        // }
         if (viewField !== undefined) {
             return viewField;
         } else {
-- 
cgit v1.2.3-70-g09d2

