From ef2cd862c062556008a1897b408399dedaee8210 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Thu, 25 Aug 2022 17:04:53 -0400
Subject: fixed issues with reloading notetaking view and having columns be
 exactly the same.  fixed adding columns so that changes are actually
 propagated to the DB.  SchemaHeaderFields are bad news...

---
 src/client/views/collections/CollectionNoteTakingViewDivider.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/client/views/collections/CollectionNoteTakingViewDivider.tsx')

diff --git a/src/client/views/collections/CollectionNoteTakingViewDivider.tsx b/src/client/views/collections/CollectionNoteTakingViewDivider.tsx
index 8d659f790..a1309b11f 100644
--- a/src/client/views/collections/CollectionNoteTakingViewDivider.tsx
+++ b/src/client/views/collections/CollectionNoteTakingViewDivider.tsx
@@ -57,7 +57,6 @@ export class CollectionNoteTakingViewDivider extends React.Component<DividerProp
                         width: 12,
                         borderRight: '4px solid #282828',
                         borderLeft: '4px solid #282828',
-                        margin: '0px 10px',
                     }}
                 />
             </div>
-- 
cgit v1.2.3-70-g09d2

