From 216385c7e84febce8988ef1390845b0c661fb04f Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Wed, 8 Nov 2023 12:55:59 -0500
Subject: fixed bug where tableBox's didn't render all of the rows they
 receive. lots of code cleanup -- moving things from Doc.ts to better
 locations.  Changed overlays and published docs to be local to their
 dashboard.  changed treeview icons.

---
 src/client/views/collections/CollectionPileView.tsx | 17 ++++++++---------
 1 file changed, 8 insertions(+), 9 deletions(-)

(limited to 'src/client/views/collections/CollectionPileView.tsx')

diff --git a/src/client/views/collections/CollectionPileView.tsx b/src/client/views/collections/CollectionPileView.tsx
index 91701b213..abb12a8ab 100644
--- a/src/client/views/collections/CollectionPileView.tsx
+++ b/src/client/views/collections/CollectionPileView.tsx
@@ -1,7 +1,6 @@
 import { action, computed, IReactionDisposer } from 'mobx';
 import { observer } from 'mobx-react';
 import { Doc, DocListCast } from '../../../fields/Doc';
-import { Height, Width } from '../../../fields/DocSymbols';
 import { ScriptField } from '../../../fields/ScriptField';
 import { NumCast, StrCast } from '../../../fields/Types';
 import { emptyFunction, returnFalse, setupMoveUpEvents } from '../../../Utils';
@@ -79,12 +78,12 @@ export class CollectionPileView extends CollectionSubView() {
     toggleStarburst = action(() => {
         this.layoutDoc._freeform_scale = undefined;
         if (this.layoutEngine() === computeStarburstLayout.name) {
-            if (this.rootDoc[Width]() !== NumCast(this.rootDoc._starburstDiameter, 500)) {
-                this.rootDoc._starburstDiameter = this.rootDoc[Width]();
+            if (NumCast(this.rootDoc._width) !== NumCast(this.rootDoc._starburstDiameter, 500)) {
+                this.rootDoc._starburstDiameter = NumCast(this.rootDoc._width);
             }
             const defaultSize = 110;
-            this.rootDoc.x = NumCast(this.rootDoc.x) + this.layoutDoc[Width]() / 2 - NumCast(this.layoutDoc._freeform_pileWidth, defaultSize) / 2;
-            this.rootDoc.y = NumCast(this.rootDoc.y) + this.layoutDoc[Height]() / 2 - NumCast(this.layoutDoc._freeform_pileHeight, defaultSize) / 2;
+            this.rootDoc.x = NumCast(this.rootDoc.x) + NumCast(this.layoutDoc._width) / 2 - NumCast(this.layoutDoc._freeform_pileWidth, defaultSize) / 2;
+            this.rootDoc.y = NumCast(this.rootDoc.y) + NumCast(this.layoutDoc._height) / 2 - NumCast(this.layoutDoc._freeform_pileHeight, defaultSize) / 2;
             this.layoutDoc._width = NumCast(this.layoutDoc._freeform_pileWidth, defaultSize);
             this.layoutDoc._height = NumCast(this.layoutDoc._freeform_pileHeight, defaultSize);
             DocUtils.pileup(this.childDocs, undefined, undefined, NumCast(this.layoutDoc._width) / 2, false);
@@ -93,10 +92,10 @@ export class CollectionPileView extends CollectionSubView() {
             this.props.Document._freeform_pileEngine = computePassLayout.name;
         } else {
             const defaultSize = NumCast(this.rootDoc._starburstDiameter, 400);
-            this.rootDoc.x = NumCast(this.rootDoc.x) + this.layoutDoc[Width]() / 2 - defaultSize / 2;
-            this.rootDoc.y = NumCast(this.rootDoc.y) + this.layoutDoc[Height]() / 2 - defaultSize / 2;
-            this.layoutDoc._freeform_pileWidth = this.layoutDoc[Width]();
-            this.layoutDoc._freeform_pileHeight = this.layoutDoc[Height]();
+            this.rootDoc.x = NumCast(this.rootDoc.x) + NumCast(this.layoutDoc._width) / 2 - defaultSize / 2;
+            this.rootDoc.y = NumCast(this.rootDoc.y) + NumCast(this.layoutDoc._height) / 2 - defaultSize / 2;
+            this.layoutDoc._freeform_pileWidth = NumCast(this.layoutDoc._width);
+            this.layoutDoc._freeform_pileHeight = NumCast(this.layoutDoc._height);
             this.layoutDoc._freeform_panX = this.layoutDoc._freeform_panY = 0;
             this.layoutDoc._width = this.layoutDoc._height = defaultSize;
             this.layoutDoc.background;
-- 
cgit v1.2.3-70-g09d2

