From 9e1234abe64d289927122ad641e3bcaf0b9eaf6e Mon Sep 17 00:00:00 2001
From: Bob Zeleznik <zzzman@gmail.com>
Date: Tue, 1 Oct 2019 02:54:03 -0400
Subject: bugs, bugs.  this time with fittobox when called from schema view
 which was passing width and height as functions, not values.  switched to
 PanelWidth and PanelHeight

---
 src/client/views/collections/CollectionStackingView.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/client/views/collections/CollectionStackingView.tsx')

diff --git a/src/client/views/collections/CollectionStackingView.tsx b/src/client/views/collections/CollectionStackingView.tsx
index c7060f110..e2020601b 100644
--- a/src/client/views/collections/CollectionStackingView.tsx
+++ b/src/client/views/collections/CollectionStackingView.tsx
@@ -141,8 +141,8 @@ export class CollectionStackingView extends CollectionSubView(doc => doc) {
             ruleProvider={this.props.Document.isRuleProvider && layoutDoc.type !== DocumentType.TEXT ? this.props.Document : this.props.ruleProvider}
             fitToBox={this.props.fitToBox}
             onClick={layoutDoc.isTemplate ? this.onClickHandler : this.onChildClickHandler}
-            width={width}
-            height={height}
+            PanelWidth={width}
+            PanelHeight={height}
             getTransform={finalDxf}
             focus={this.props.focus}
             CollectionDoc={this.props.CollectionView && this.props.CollectionView.props.Document}
-- 
cgit v1.2.3-70-g09d2

