From 7fffe13954ed0113bf1b2f9318518d015dc63844 Mon Sep 17 00:00:00 2001
From: bob <bcz@cs.brown.edu>
Date: Tue, 21 Jan 2020 17:07:35 -0500
Subject: made onClick override default link follow behavior

---
 src/client/views/collections/CollectionView.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/client/views/collections/CollectionView.tsx')

diff --git a/src/client/views/collections/CollectionView.tsx b/src/client/views/collections/CollectionView.tsx
index a99bd29d6..430aecef4 100644
--- a/src/client/views/collections/CollectionView.tsx
+++ b/src/client/views/collections/CollectionView.tsx
@@ -91,7 +91,6 @@ export class CollectionView extends Touchable<FieldViewProps> {
     @observable private static _safeMode = false;
     public static SetSafeMode(safeMode: boolean) { this._safeMode = safeMode; }
 
-    @computed get dataDoc() { return this.props.DataDoc && this.props.Document.isTemplateField ? Doc.GetProto(this.props.DataDoc) : Doc.GetProto(this.props.Document); }
     @computed get extensionDoc() { return Doc.fieldExtensionDoc(this.props.Document, this.props.fieldKey); }
 
     get collectionViewType(): CollectionViewType | undefined {
-- 
cgit v1.2.3-70-g09d2

