From 807743bdd351b639e3328fa1ed6f128738f95b9f Mon Sep 17 00:00:00 2001
From: Stanley Yip <stanley_yip@brown.edu>
Date: Sat, 4 Apr 2020 15:52:20 -0700
Subject: warning fixes

---
 src/client/views/collections/CollectionView.tsx | 7 +++++--
 1 file changed, 5 insertions(+), 2 deletions(-)

(limited to 'src/client/views/collections/CollectionView.tsx')

diff --git a/src/client/views/collections/CollectionView.tsx b/src/client/views/collections/CollectionView.tsx
index 729101bc3..1501ce151 100644
--- a/src/client/views/collections/CollectionView.tsx
+++ b/src/client/views/collections/CollectionView.tsx
@@ -42,6 +42,7 @@ import { Id } from '../../../new_fields/FieldSymbols';
 import { listSpec } from '../../../new_fields/Schema';
 import { Docs } from '../../documents/Documents';
 import { ScriptField, ComputedField } from '../../../new_fields/ScriptField';
+import { InteractionUtils } from '../../util/InteractionUtils';
 const higflyout = require("@hig/flyout");
 export const { anchorPoints } = higflyout;
 export const Flyout = higflyout.default;
@@ -99,12 +100,14 @@ export class CollectionView extends Touchable<FieldViewProps> {
     public static LayoutString(fieldStr: string) { return FieldView.LayoutString(CollectionView, fieldStr); }
 
     private _isChildActive = false;   //TODO should this be observable?
-    get _isLightboxOpen() { return BoolCast(this.props.Document.isLightboxOpen); };
-    set _isLightboxOpen(value) { this.props.Document.isLightboxOpen = value; };
+    get _isLightboxOpen() { return BoolCast(this.props.Document.isLightboxOpen); }
+    set _isLightboxOpen(value) { this.props.Document.isLightboxOpen = value; }
     @observable private _curLightboxImg = 0;
     @observable private static _safeMode = false;
     public static SetSafeMode(safeMode: boolean) { this._safeMode = safeMode; }
 
+    protected multiTouchDisposer?: InteractionUtils.MultiTouchEventDisposer;
+
     get collectionViewType(): CollectionViewType | undefined {
         const viewField = NumCast(this.props.Document._viewType);
         if (CollectionView._safeMode) {
-- 
cgit v1.2.3-70-g09d2

