From 483a4d35ba2c522b889c7bd9b839a0af131ec0bb Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Tue, 8 Sep 2020 19:26:24 -0400
Subject: updated the way NativeWidth/Height props work so that, when
 specified, they override locally specified values

---
 src/client/views/collections/SchemaTable.tsx | 2 --
 1 file changed, 2 deletions(-)

(limited to 'src/client/views/collections/SchemaTable.tsx')

diff --git a/src/client/views/collections/SchemaTable.tsx b/src/client/views/collections/SchemaTable.tsx
index 1fb7aa04a..854254195 100644
--- a/src/client/views/collections/SchemaTable.tsx
+++ b/src/client/views/collections/SchemaTable.tsx
@@ -570,8 +570,6 @@ export class SchemaTable extends React.Component<SchemaTableProps> {
                     ref="overlay"><ContentFittingDocumentView
                         Document={this._showDoc}
                         DataDoc={this._showDataDoc}
-                        NativeHeight={returnZero}
-                        NativeWidth={returnZero}
                         fitToBox={true}
                         FreezeDimensions={true}
                         focus={emptyFunction}
-- 
cgit v1.2.3-70-g09d2

