From c9a84a7d74efa820d1dc55d8ef93bec40315be4a Mon Sep 17 00:00:00 2001
From: Bob Zeleznik <zzzman@gmail.com>
Date: Fri, 18 Oct 2019 01:29:33 -0400
Subject: link lines are working properly except when things get panned/moved
 ... need to turn off or get updates somehow.

---
 .../collections/collectionFreeForm/CollectionFreeFormLinksView.tsx    | 4 +---
 1 file changed, 1 insertion(+), 3 deletions(-)

(limited to 'src/client/views/collections/collectionFreeForm/CollectionFreeFormLinksView.tsx')

diff --git a/src/client/views/collections/collectionFreeForm/CollectionFreeFormLinksView.tsx b/src/client/views/collections/collectionFreeForm/CollectionFreeFormLinksView.tsx
index a26febda4..e9191c176 100644
--- a/src/client/views/collections/collectionFreeForm/CollectionFreeFormLinksView.tsx
+++ b/src/client/views/collections/collectionFreeForm/CollectionFreeFormLinksView.tsx
@@ -68,9 +68,7 @@ export class CollectionFreeFormLinksView extends React.Component {
         //     });
     }
     componentWillUnmount() {
-        if (this._brushReactionDisposer) {
-            this._brushReactionDisposer();
-        }
+        this._brushReactionDisposer && this._brushReactionDisposer();
     }
     @computed
     get uniqueConnections() {
-- 
cgit v1.2.3-70-g09d2

