From 130b5c55f954a011e91355c79ade4b9f91bd84e9 Mon Sep 17 00:00:00 2001
From: Tyler Schicke <tyler_schicke@brown.edu>
Date: Sat, 18 May 2019 18:17:39 -0400
Subject: clamped scale and reverted safe mode

---
 .../views/collections/collectionFreeForm/CollectionFreeFormView.tsx     | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/collections/collectionFreeForm/CollectionFreeFormView.tsx')

diff --git a/src/client/views/collections/collectionFreeForm/CollectionFreeFormView.tsx b/src/client/views/collections/collectionFreeForm/CollectionFreeFormView.tsx
index 264c89d67..956a5668a 100644
--- a/src/client/views/collections/collectionFreeForm/CollectionFreeFormView.tsx
+++ b/src/client/views/collections/collectionFreeForm/CollectionFreeFormView.tsx
@@ -211,7 +211,7 @@ export class CollectionFreeFormView extends CollectionSubView(PanZoomDocument) {
             let [x, y] = this.getTransform().transformPoint(e.clientX, e.clientY);
             let localTransform = this.getLocalTransform().inverse().scaleAbout(deltaScale, x, y);
 
-            let safeScale = Math.abs(localTransform.Scale);
+            let safeScale = Math.max(0.002, localTransform.Scale);
             this.props.Document.scale = Math.abs(safeScale);
             this.setPan(-localTransform.TranslateX / safeScale, -localTransform.TranslateY / safeScale);
             e.stopPropagation();
-- 
cgit v1.2.3-70-g09d2

