From e7235baa7ed998908dec8bf48e4c244594aa76bb Mon Sep 17 00:00:00 2001
From: Nathan-SR <144961007+Nathan-SR@users.noreply.github.com>
Date: Sun, 8 Sep 2024 18:42:12 -0400
Subject: schema changes reverted

---
 src/client/views/collections/collectionSchema/CollectionSchemaView.tsx | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'src/client/views/collections/collectionSchema/CollectionSchemaView.tsx')

diff --git a/src/client/views/collections/collectionSchema/CollectionSchemaView.tsx b/src/client/views/collections/collectionSchema/CollectionSchemaView.tsx
index 12c342b9f..59ccec71f 100644
--- a/src/client/views/collections/collectionSchema/CollectionSchemaView.tsx
+++ b/src/client/views/collections/collectionSchema/CollectionSchemaView.tsx
@@ -46,7 +46,6 @@ import { SchemaCellField } from './SchemaCellField';
 import { threadId } from 'worker_threads';
 import { FontIconBox } from '../../nodes/FontIconBox/FontIconBox';
 
-// eslint-disable-next-line @typescript-eslint/no-var-requires
 const { SCHEMA_NEW_NODE_HEIGHT } = require('../../global/globalCssVariables.module.scss'); // prettier-ignore
 
 export const FInfotoColType: { [key: string]: ColumnType } = {
@@ -1539,4 +1538,4 @@ class CollectionSchemaViewDocs extends React.Component<CollectionSchemaViewDocsP
             </div>
         );
     }
-}
+}
\ No newline at end of file
-- 
cgit v1.2.3-70-g09d2

