From e23602188d575c3f2303bfc85114ac82561c7bbe Mon Sep 17 00:00:00 2001
From: Bob Zeleznik <zzzman@gmail.com>
Date: Fri, 29 May 2020 13:14:59 -0400
Subject: added toggle to switch from fade to default keyframe. added
 mixBlendMode for collections

---
 src/client/views/nodes/CollectionFreeFormDocumentView.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/client/views/nodes/CollectionFreeFormDocumentView.tsx')

diff --git a/src/client/views/nodes/CollectionFreeFormDocumentView.tsx b/src/client/views/nodes/CollectionFreeFormDocumentView.tsx
index 697111ac8..910aa744d 100644
--- a/src/client/views/nodes/CollectionFreeFormDocumentView.tsx
+++ b/src/client/views/nodes/CollectionFreeFormDocumentView.tsx
@@ -154,6 +154,7 @@ export class CollectionFreeFormDocumentView extends DocComponent<CollectionFreeF
                 width: this.width,
                 height: this.height,
                 zIndex: this.ZInd,
+                mixBlendMode: StrCast(this.layoutDoc.mixBlendMode) as any,
                 display: this.ZInd === -99 ? "none" : undefined,
                 pointerEvents: this.props.Document.isBackground || this.Opacity === 0 ? "none" : this.props.pointerEvents ? "all" : undefined
             }} >
-- 
cgit v1.2.3-70-g09d2

