From b1f85154edc250a18d0bc033df91ee1249975946 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Thu, 27 Mar 2025 12:12:20 -0400
Subject: fix so that schemacellfield doesn't trigger a finalizeEdit when it's
 not editing.  added 'red' color for template fields to schematablecell. 
 fixed set field to allow setting data fields when field is an '_' and no
 template.  fixed setting '=' when getting a keyValueString for empty fields
 with an '_' key.

---
 src/client/views/nodes/ComparisonBox.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/nodes/ComparisonBox.tsx')

diff --git a/src/client/views/nodes/ComparisonBox.tsx b/src/client/views/nodes/ComparisonBox.tsx
index 992fbba66..482af336c 100644
--- a/src/client/views/nodes/ComparisonBox.tsx
+++ b/src/client/views/nodes/ComparisonBox.tsx
@@ -657,7 +657,7 @@ export class ComparisonBox extends ViewBoxAnnotatableComponent<FieldViewProps>()
         if (whichSlot === this.backKey && !layoutTemplateString?.includes(whichSlot)) {
             const queryText = altText?.replace('(this)', subjectText); // TODO: this should be done in Doc.setField but it doesn't know about the fieldKey ...
             if (queryText?.match(/\(\(.*\)\)/)) {
-                Doc.SetField(this.Document, whichSlot, ':=' + queryText, false); // make the second slot be a computed field on the data doc that calls ChatGpt
+                Doc.SetField(this.Document, whichSlot, ':=' + queryText); // make the second slot be a computed field on the data doc that calls ChatGpt
             }
         }
         return layoutTemplateString;
-- 
cgit v1.2.3-70-g09d2

