From ecf6d510b5ab2e91753907adf4aadccacc3ac4fa Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Thu, 7 Oct 2021 13:33:37 -0400
Subject: fixed clicking the contextmenu button on timeline entries. set
 fitWidth for timeline documents since they sometimesm couldn't be clicked (eg
 an Image would not necesarily fit the span in the timeline without fitWidth).
  fixed error on comparison box. fixed having lock show up for annotation
 documents..

---
 src/client/views/nodes/ComparisonBox.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/nodes/ComparisonBox.tsx')

diff --git a/src/client/views/nodes/ComparisonBox.tsx b/src/client/views/nodes/ComparisonBox.tsx
index 72c7e4f45..15c33c8bf 100644
--- a/src/client/views/nodes/ComparisonBox.tsx
+++ b/src/client/views/nodes/ComparisonBox.tsx
@@ -89,7 +89,7 @@ export class ComparisonBox extends ViewBoxAnnotatableComponent<ViewBoxAnnotatabl
         };
         const displayDoc = (which: string) => {
             var whichDoc = Cast(this.dataDoc[which], Doc, null);
-            if (whichDoc.type === DocumentType.MARKER) whichDoc = Cast(whichDoc.annotationOn, Doc, null);
+            if (whichDoc?.type === DocumentType.MARKER) whichDoc = Cast(whichDoc.annotationOn, Doc, null);
             return whichDoc ? <>
                 <DocumentView {...OmitKeys(this.props, ["NativeWidth", "NativeHeight"]).omit}
                     isContentActive={returnFalse}
-- 
cgit v1.2.3-70-g09d2

