From 71790cb5ee62fa443a24e6a5181383cf46350c32 Mon Sep 17 00:00:00 2001
From: Naafiyan Ahmed <naafiyan@gmail.com>
Date: Wed, 29 Jun 2022 16:16:18 -0400
Subject: basic graph not working

---
 src/client/views/nodes/DataViz.tsx | 21 ---------------------
 1 file changed, 21 deletions(-)
 delete mode 100644 src/client/views/nodes/DataViz.tsx

(limited to 'src/client/views/nodes/DataViz.tsx')

diff --git a/src/client/views/nodes/DataViz.tsx b/src/client/views/nodes/DataViz.tsx
deleted file mode 100644
index d9541dba0..000000000
--- a/src/client/views/nodes/DataViz.tsx
+++ /dev/null
@@ -1,21 +0,0 @@
-import { observer } from "mobx-react";
-import * as React from "react";
-import { ViewBoxBaseComponent } from '../DocComponent';
-import "./DataViz.scss";
-import { FieldView, FieldViewProps } from "./FieldView";
-
-@observer
-export class DataVizBox extends ViewBoxBaseComponent<FieldViewProps>() {
-
-    public static LayoutString(fieldKey: string) {  return FieldView.LayoutString(DataVizBox, fieldKey);  }
-
-    render() {
-        return (
-            <div >
-                <div>
-                    Hi
-                </div>
-            </div>
-        );
-    }
-}
\ No newline at end of file
-- 
cgit v1.2.3-70-g09d2

