From 0afa18bfc219c597ad55a52ffc5a2086c3d110d2 Mon Sep 17 00:00:00 2001
From: bob <bcz@cs.brown.edu>
Date: Fri, 12 Apr 2019 14:15:05 -0400
Subject: changed signatures of focus functions.

---
 src/client/views/nodes/FieldView.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/client/views/nodes/FieldView.tsx')

diff --git a/src/client/views/nodes/FieldView.tsx b/src/client/views/nodes/FieldView.tsx
index 40b44aae5..0037d7b28 100644
--- a/src/client/views/nodes/FieldView.tsx
+++ b/src/client/views/nodes/FieldView.tsx
@@ -19,7 +19,7 @@ import { ListField } from "../../../fields/ListField";
 import { DocumentContentsView } from "./DocumentContentsView";
 import { Transform } from "../../util/Transform";
 import { KeyStore } from "../../../fields/KeyStore";
-import { returnFalse, emptyFunction } from "../../../Utils";
+import { returnFalse, emptyDocFunction } from "../../../Utils";
 
 
 //
@@ -85,7 +85,7 @@ export class FieldView extends React.Component<FieldViewProps> {
                     PanelHeight={() => 100}
                     isTopMost={true} //TODO Why is this top most?
                     selectOnLoad={false}
-                    focus={emptyFunction}
+                    focus={emptyDocFunction}
                     isSelected={returnFalse}
                     select={returnFalse}
                     layoutKey={KeyStore.Layout}
-- 
cgit v1.2.3-70-g09d2

