From af0741acc8e4aad40c5db206ccfd97cffecefbd4 Mon Sep 17 00:00:00 2001
From: Bob Zeleznik <zzzman@gmail.com>
Date: Mon, 13 Jul 2020 21:26:03 -0400
Subject: simplified tools panel (remove buxton, import folder).  changed
 spacing of fonticon labels.

---
 src/client/views/nodes/FontIconBox.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/nodes/FontIconBox.tsx')

diff --git a/src/client/views/nodes/FontIconBox.tsx b/src/client/views/nodes/FontIconBox.tsx
index 5e8dd2497..86e9a4527 100644
--- a/src/client/views/nodes/FontIconBox.tsx
+++ b/src/client/views/nodes/FontIconBox.tsx
@@ -67,7 +67,7 @@ export class FontIconBox extends DocComponent<FieldViewProps, FontIconDocument>(
                 boxShadow: this.layoutDoc.ischecked ? `4px 4px 12px black` : undefined
             }}>
             <FontAwesomeIcon className="fontIconBox-icon" icon={this.dataDoc.icon as any} color={StrCast(this.layoutDoc.color, this._foregroundColor)} size="sm" />
-            {!this.rootDoc.label ? (null) : <div className="fontIconBox-label"> {StrCast(this.rootDoc.label).substring(0, 5)} </div>}
+            {!this.rootDoc.label ? (null) : <div className="fontIconBox-label"> {StrCast(this.rootDoc.label).substring(0, 6)} </div>}
         </button>;
     }
 }
\ No newline at end of file
-- 
cgit v1.2.3-70-g09d2

