From 8680d1c31d4f835663c070f5b8cef57254e75e28 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Tue, 12 Nov 2024 16:42:35 -0500
Subject: made equation background same as text. fixed dflt stroke/link width
 to both be 1.  made function plot axis ranges get saved to Doc. marked
 equation->function links as being svgs.  fixed initial size of equation
 boxes..

---
 src/client/views/nodes/LinkBox.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/nodes/LinkBox.tsx')

diff --git a/src/client/views/nodes/LinkBox.tsx b/src/client/views/nodes/LinkBox.tsx
index 4d9d2460e..c62a8afb1 100644
--- a/src/client/views/nodes/LinkBox.tsx
+++ b/src/client/views/nodes/LinkBox.tsx
@@ -160,7 +160,7 @@ export class LinkBox extends ViewBoxBaseComponent<FieldViewProps>() {
             // eslint-disable-next-line camelcase
             const { stroke_markerScale: strokeMarkerScale, stroke_width: strokeRawWidth, stroke_startMarker: strokeStartMarker, stroke_endMarker: strokeEndMarker, stroke_dash: strokeDash } = this.Document;
 
-            const strokeWidth = NumCast(strokeRawWidth, 4);
+            const strokeWidth = NumCast(strokeRawWidth, 1);
             const linkDesc = StrCast(this.dataDoc.link_description) || ' ';
             const labelText = linkDesc.substring(0, 50) + (linkDesc.length > 50 ? '...' : '');
             return (
-- 
cgit v1.2.3-70-g09d2

