From aed2cab6e4898d41a991a7f01a908275465da6ff Mon Sep 17 00:00:00 2001
From: brynnchernosky <56202540+brynnchernosky@users.noreply.github.com>
Date: Tue, 2 May 2023 16:22:26 -0400
Subject: debug

---
 src/client/views/nodes/PhysicsBox/PhysicsSimulationBox.tsx | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'src/client/views/nodes/PhysicsBox/PhysicsSimulationBox.tsx')

diff --git a/src/client/views/nodes/PhysicsBox/PhysicsSimulationBox.tsx b/src/client/views/nodes/PhysicsBox/PhysicsSimulationBox.tsx
index 691f1145c..143ff9896 100644
--- a/src/client/views/nodes/PhysicsBox/PhysicsSimulationBox.tsx
+++ b/src/client/views/nodes/PhysicsBox/PhysicsSimulationBox.tsx
@@ -115,8 +115,8 @@ export default class PhysicsSimulationBox extends ViewBoxAnnotatableComponent<Fi
     // Used throughout sims
     this.layoutDoc._width = 1000;
     this.layoutDoc._height = 1000;
-    this.xMax = this.layoutDoc._width*0.8 ?? 800;
-    this.yMax = this.layoutDoc._height*0.8 ?? 800;
+    this.xMax = this.layoutDoc._width*0.7 ?? 700;
+    this.yMax = this.layoutDoc._height*0.7 ?? 700;
     this.radius = 50;
     this.dataDoc.reviewCoefficient = this.dataDoc.reviewCoefficient ?? 0;
     this.dataDoc.questionVariables = this.dataDoc.questionVariables ?? [];
@@ -372,8 +372,8 @@ export default class PhysicsSimulationBox extends ViewBoxAnnotatableComponent<Fi
   }
 
   componentDidUpdate() {
-    this.xMax = this.layoutDoc._width*0.8 ?? 800;
-    this.yMax = this.layoutDoc._height*0.8 ?? 800;
+    this.xMax = this.layoutDoc._width*0.7 ?? 700;
+    this.yMax = this.layoutDoc._height*0.7 ?? 700;
     this.radius = 0.05*this.layoutDoc._height ?? 50;
     console.log("width: ", this.xMax)
     console.log("height: ", this.yMax)
-- 
cgit v1.2.3-70-g09d2

