From 51066af7ddc8dc890ed67858579227f8484e7263 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Fri, 16 Oct 2020 01:24:28 -0400
Subject: fixed duration of slides so that 100ms works.

---
 src/client/views/nodes/PresBox.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/nodes/PresBox.tsx')

diff --git a/src/client/views/nodes/PresBox.tsx b/src/client/views/nodes/PresBox.tsx
index d03fbc03f..8e3679452 100644
--- a/src/client/views/nodes/PresBox.tsx
+++ b/src/client/views/nodes/PresBox.tsx
@@ -407,7 +407,7 @@ export class PresBox extends ViewBoxBaseComponent<FieldViewProps, PresBoxSchema>
                 activeItem = Cast(this.childDocs[this.itemIndex], Doc, null);
                 targetDoc = Cast(activeItem.presentationTargetDoc, Doc, null);
                 duration = NumCast(activeItem.presDuration) + NumCast(activeItem.presTransition);
-                if (duration <= 100) { duration = 2500; }
+                if (duration < 100) { duration = 2500; }
                 if (NumCast(targetDoc.lastFrame) > 0) {
                     for (var f = 0; f < NumCast(targetDoc.lastFrame); f++) {
                         await timer(duration / NumCast(targetDoc.lastFrame));
-- 
cgit v1.2.3-70-g09d2

