From 55bdee9e73513118c242f1665150dc7698eac50e Mon Sep 17 00:00:00 2001
From: Bob Zeleznik <zzzman@gmail.com>
Date: Sun, 28 Jun 2020 00:16:38 -0400
Subject: renamed some fields scale=>_viewScale, transtion=>dataTransition,
 panTransformType=>_viewTransform.  fixed animation frames to not break acls
 (sort of).

---
 src/client/views/nodes/PresBox.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/client/views/nodes/PresBox.tsx')

diff --git a/src/client/views/nodes/PresBox.tsx b/src/client/views/nodes/PresBox.tsx
index dbc879920..8818d375e 100644
--- a/src/client/views/nodes/PresBox.tsx
+++ b/src/client/views/nodes/PresBox.tsx
@@ -62,8 +62,8 @@ export class PresBox extends ViewBoxBaseComponent<FieldViewProps, PresBoxSchema>
         const lastFrame = Cast(presTargetDoc.lastFrame, "number", null);
         const curFrame = NumCast(presTargetDoc.currentFrame);
         if (lastFrame !== undefined && curFrame < lastFrame) {
-            presTargetDoc.transition = "all 1s";
-            setTimeout(() => presTargetDoc.transition = undefined, 1010);
+            presTargetDoc._viewTransition = "all 1s";
+            setTimeout(() => presTargetDoc._viewTransition = undefined, 1010);
             presTargetDoc.currentFrame = curFrame + 1;
         }
         else if (this.childDocs[this.itemIndex + 1] !== undefined) {
-- 
cgit v1.2.3-70-g09d2

