From 28ec1d48ee9e8f4d8d82337c2116ac8027ed653d Mon Sep 17 00:00:00 2001
From: Michael <michael.foiani@gmail.com>
Date: Thu, 9 Jun 2022 11:08:34 -0400
Subject: got the progress bar to move while recording, but it is a tad slow

---
 src/client/views/nodes/RecordingBox/RecordingView.tsx | 8 ++------
 1 file changed, 2 insertions(+), 6 deletions(-)

(limited to 'src/client/views/nodes/RecordingBox/RecordingView.tsx')

diff --git a/src/client/views/nodes/RecordingBox/RecordingView.tsx b/src/client/views/nodes/RecordingBox/RecordingView.tsx
index 68d85855c..40117c41c 100644
--- a/src/client/views/nodes/RecordingBox/RecordingView.tsx
+++ b/src/client/views/nodes/RecordingBox/RecordingView.tsx
@@ -91,12 +91,6 @@ export function RecordingView(props: IRecordingViewProps) {
 
     }, [videos])
   
-    
-  // make useEffect for progess and log when it fires
-  useEffect(() => {
-    console.log('progress', progress)
-  }, [progress])
-  
   useEffect(() => {
 
     if (finished) {
@@ -302,6 +296,8 @@ export function RecordingView(props: IRecordingViewProps) {
               videos={videos}
               setVideos={setVideos}
               orderVideos={orderVideos}
+              progress={progress}
+              recording={recording}
                               // playSegment={playSegment}
                               />
                   </div>
-- 
cgit v1.2.3-70-g09d2

