From 19adcca1a89405a47da57fee64fe5fde4720c16a Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Mon, 5 May 2025 14:05:32 -0400
Subject: got rid of dash _xPadding/_yPadding in favor of just using
 _xMargin/_yMargin.  cleaned up linearView field names

---
 src/client/views/nodes/ScreenshotBox.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/client/views/nodes/ScreenshotBox.tsx')

diff --git a/src/client/views/nodes/ScreenshotBox.tsx b/src/client/views/nodes/ScreenshotBox.tsx
index 4f02d68d6..603dcad5c 100644
--- a/src/client/views/nodes/ScreenshotBox.tsx
+++ b/src/client/views/nodes/ScreenshotBox.tsx
@@ -335,8 +335,8 @@ export class ScreenshotBox extends ViewBoxAnnotatableComponent<FieldViewProps>()
                                 select={emptyFunction}
                                 isContentActive={emptyFunction}
                                 NativeDimScaling={returnOne}
-                                xPadding={25}
-                                yPadding={10}
+                                xMargin={25}
+                                yMargin={10}
                                 whenChildContentsActiveChanged={emptyFunction}
                                 removeDocument={returnFalse}
                                 moveDocument={returnFalse}
-- 
cgit v1.2.3-70-g09d2

