From 8fa21aabb237586cf9cffd59ae573f2ba48857e9 Mon Sep 17 00:00:00 2001
From: Shravya Ramesh <shravs1208@gmail.com>
Date: Mon, 8 Feb 2021 19:19:16 -0800
Subject: changed status bar from default to black

---
 src/screens/main/NotificationsScreen.tsx | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'src/screens/main/NotificationsScreen.tsx')

diff --git a/src/screens/main/NotificationsScreen.tsx b/src/screens/main/NotificationsScreen.tsx
index f35bb22c..266ba3f9 100644
--- a/src/screens/main/NotificationsScreen.tsx
+++ b/src/screens/main/NotificationsScreen.tsx
@@ -5,6 +5,7 @@ import React, {useCallback, useEffect, useState} from 'react';
 import {
   RefreshControl,
   SectionList,
+  StatusBar,
   StyleSheet,
   Text,
   View,
@@ -146,6 +147,7 @@ const NotificationsScreen: React.FC = () => {
 
   return (
     <SafeAreaView>
+      <StatusBar barStyle={'dark-content'} />
       <View style={styles.header}>
         <Text style={styles.headerText}>Notifications</Text>
         <View style={styles.underline} />
-- 
cgit v1.2.3-70-g09d2

